Tyla He

March 30, 1992/093

From the Parks & Recreation Director, March 26th, 1992 regarding Equipment Replacement ~ Mower.

Moved by Alderman Thompson: Seconded by Alderman Wright:

That Council authorize the purchase of a rotary mower from Oakcreek as outlined in the cost comparison attached to Council Agenda.

Carried.

LATE ITEM:

From the City Engineer, March 18, 1992 regarding Laurier/Devon/ Burns Watermain Reconstruction Appointment of Consulting Engineers.

Moved by Alderman Keryluk: Seconded by Alderman Talbot:

That Dayton & Knight be appointed as Consulting Engineers for the Laurier Avenue, Devon Road, and Burns Road Watermain design and construction projects at an estimated cost of $68,163 (including GST).

That the Laurier & Devon Watermains be constructed in 1992 and the Burns Road watermain be designed in 1992 and tendered for construction in 1993 (subject to 1993 budget approval).

That $68,163 be allocated from the 1992 Capital Water Utility Budget for this purpose.

Carried.

ADJOURNMENT:

Moved by Alderman Gordon: Seconded by Alderman Talbot:

That this meeting do now adjourn. Carried,

seas he

At 8:45 p.m. the meeting adjourned.