OF THE BUILDING INSPECTORS

A Building Inspector:

5.l.1. may enter any land, building or premises at any reasonable time for the purpose of ascertaining that the regulations of this Bylaw are being observed;

where any residence is occupied, shall obtain the consent, of the occupant or provide written notice twenty-four hours in advance of entry; and

5.1.3. shall carry proper credentials confirming his or her status as a Building Inspector.

A Building Inspector may revoke or refuse to issue a permit where the results of tests of materials, devices, construction methods, structural assemblies or foundation conditions are not satisfactory.

5.3. A Bullding Inspector may order the correction of any work which is being or has been improperly done under a permit.

APPLICATIONS

6.1. Every person shall apply for and obtain:

6.1.1. a building permit before constructing, repair ing or altering a building or structure;

a plumbing permit before installing, repairing or altering any plumbing and similar works as set out in Section 3.2; and

a demolition permit before demolishing a building. a building moving permi it before moving a building to any property

6.1.5. a. sign permit before constructing or plac sing a sign regulated by the Sign Bylaw 1991 #2328 |

An application for a building permit shall:

6.2.1. be made in. the form attached as Schedule A to this Bylaw;

6.262. | be signed by the Owner >r agent

Cn