(DATE)

Bel Construction Ltd. 18509 =~ 96th Avenue

SURREY, B.C. V3T 4W2

Dear Sirss

Res Notice of Award Pitt River Road Improvements Project No. 900-88. a

We are pleased to inform you that the subject contract has been awarded

to your firm.

You should now comply with the requirements of Article 51

of the Supplementary General Conditions regarding insurance, Article 32 of the General Conditions regarding bonds, and Article 38 of the General Conditions regarding a construction schedule. The required documehtation should be forwarded to Associated Engineering (B.C.} Ltd. as soon as possible, after which contract documents will be provided to you for

execution.

Note that the signature and seal of your firm are required on the bonds as well as those of your bonding company. a

This is not the Notice to Proceed with the work. The Notice to Proceed will be issued following execution of the contract documents.

Yours truly,

(APPROPRIATE SIGNING OFFICIAL)

cc: Associated Engineering (B.C.) Ltd., Attention: N.P. D'Andrea, P.Eng

Saat ix

*