4s

aie

Sin Ai TUS TAT Soa Be eee ‘ fi i j r Herwt hic bissaoniild 3 a sagt e % eal 2g pee ’ eaten Cpitie ties Sf ira ba oY f resig * " " tried Caminte $ Biss ‘ ; a gle tte,

first sprinkler head; $28.00

for the installation of each meter of f{ireline: $1.00 per metre;

for the installation of each fire hydrant; $23.30

6.3 each additional sprinkler head; $ 0.85 6.3 each siamese connection; $18.00

6.3 each hose cabinet, hose outlet, wet or dry outlet or standpipe; $18.00

On Site Service Permit Faas

6.4.1. for each meter of piping associated with water main installations or sanitary sewer installations or storm drainage sewer installations for other than single family or two family dwellings; 60¢ per metre;

6.4.2. manhole, interceptor, catch basin or lawn drain

6.4.3. for the installation of each fire hydrant; é

7. BULRLDING DEMOLITION PERMITS RES

The permit fee for demolition of a building or structure is $56.00; payable prior to issuance of a demolition permit.

ae