1 recovery and if you went below the 100 ton then

I have had the opportunity at the U.B.C.Mm. discussion with Mr.

B.C. Hydro who is in the He informed me that Hydro would purchase - y be at 2.2 cents per killowatt, this er the cost of insulation of the generating Because it requires a much higher degree of cleanliness in the steam in the boiler System and the cost will increase very rapidy for this type ‘of generation. The Wilder Corporation, Mr. Zirloin and Mr. Philipson are prepared to attend a Council meeting if the Council members wish further indepth information

at this time. I would suggest that instead of meeting with them at this time that we continue the investigation further before any consideration is given to inviting them to a Council meeting for further indepth information on this matter.

G.R. Laking, Alderman.