City of Port Coquitlam

Capital Improvement Program

Project Operating Department New Police Station Police

Description Justification

To replace the existing Police Station Overcrowding with either an expanded facility on the same site, or a new facility in the City of Port Coquitlam.

Location Unknown

Amount

Design & construct | $4,000,000

5

Totals $4,000,000 4 $4,000,904

Estimated NET. effect on operating costs $18,500 $ 18,500

Repayment costs interest. Term 20 years. ~ 1$65,000 $200,000

Comments

Repayment phased in

Project Number