SEMINAR FORMAT

‘LOCATION MUNICIPALITIES PROJECTS Royal Towers Hotel, New Westminster Annacis Island STP 6th St. and Royal, Coquitlam Air Pollution Monitoring New Westminster Port Coquitlam _ Station Port Moody

Pitt Meadows Maple Ridge

10:30 a.m. Introductions

10:45 a.m. GVRD Slide Show

11:00 a.m. Sewerage System — Explanation

11:10 a.n. Water System ~ Explanation

11:20 a.m. . Air Pollution Control - ExplJanation

11:30 a.m. Discussion ~ questions and answers

12:00 noon Lunch

"1:00-3:00 p.m. Guided tour of projects

3:30 p.m. Return to hotel