C6 - The Terrace Standard, Wednesday, November 30, 1994

TERRACE STANDARD

CTION ADS

KSAN HOUSE SOCIETY

TERRACE EMERGENCY SHELTER

AUXILIARY SUPPORT WORKER 2 UNION POSITIONS

TERMS: Rotating schedule - weekends involved $10,23/hr, plus .40/hr. In lieu of benefits and shift differential.

QUALIFICATIONS: Minimum grade 12. SSW or HSW certificate and/or relevant practical experience. Should have or be willing to obtain survival ist Ald certificate.

APPLICANTS SHOULD POSSESS:

- Good knowledge of community resources

- Ability to deal with residents In a professional manner and complete confidentiality - Good interpersonal and communication skills

- Familiarity with poverty issues, native culture and the gain act wauld be an asset

- Ability to handle stress

- Ability to work as a team member

- Ability to assist men and women in crisis.

- Successful applicant must be willing to submit to a criminal record search and sign an oath of canfidentiality,

Resumes with cover letter will be accepted until December 2, 1994 and should be addressed to:

Emergency Shelter Coordinator

Ksan House Society

202-4630 Lazelle Avenue

TERRACE, BC V8G 186

For additional information please phone

Lelia Burton at 635-5890.

Proposed start date is December 13, 1994.

TEMPORARY PART-TIME SUPPORT SERVICES CLERK Terrace

Northwest Community College in Terrace has an opening for a temporary part- time clerk in Program Support Services commencing as soon as possible and terminating March 31, 1995. The salary will be in accordance with the College Agreement with the B.C.G.E.U, Level 4 Scale. DUTIES: Under the supervision of the Coordinator of Support Services, the incumbent will work with other members of the Support Services team to provide clerical support services to programs; to operate a multi-line switchboard console and route calls to the appropriate person or location; to train relief operators on the switchboard; to use word processing equipment and associated computer programs in a Macintosh environment for the production of learning guides, instructional materials, exams and schedules. Additional duties are fiting, communications, and other related duties as assigned by the supervisor. EDUCATION: Secondary School graduation or equivalent combination of work, education and experience. Prefer additional clerical certification.

SKILLS: Ability to type a minimum of 50 w.p.m, to operate Macintosh computer equipment using Microsoft word and Super Paint, photocopy machines and a multi-line switchboard. The ability to relate weil with staff and students, and to work as a team member. Excellent communication skills are mandatory. EXPERIENCE: A minimum of two years clerical experience. —

We thank all applicants for their interest, however, only thase selected for an interview will be contacted. Resumes should be submitted by December 7 to:

Competition 94.093B Manager, Human Resources Box 726, Terrace, B.C. V8G 4C2

NORTHWEST COMMUNITY COLLEGE

EMPLOYMENT OPPORTUNITY

Burnslake Specialty Wood Ltd, has an immediate opening for a:

QUALITY ASSURANCE SUPERVISOR

to join the team managing the planer tine, sart line, and cut-up line processing. Reporting to the Production Manager, your primary responsibilities will be to supervise the planer line with involvement in coordinating the sort and cut-up lines. The ideal candidate will have: * Experience in a lumber manufacturing facility. * Provincially recognized lumber grading ticket. * Strong interpersonal skills and leadership qualities * Familiarity with quality assurance procedures * Computer literacy interested applicants should submit their resumes by Wednesday, November 30, 1994 to: Preduction Manager Burnslake Specialty Wood Ltd, Box 1229, Burns Lake, BC VOJ 1E0

PARTS PERSON

TERRATECH EQUIPMENT INC., the Komatsu, Timberjack, and Dresser distributor, has an immediate opportunity in Smithers for a qualified Parts Person.

We are seeking an energetic, customer-oriented individual who ide- ally has exposure to our product lines.

Candidates must be able to work independently and be knowledge- able in all parts department functions.

Please reply to:

Terratech Equipment Inc.

1063 Pacific Street, Princa George, B.C. V2N 2K8,

Attn: Ernie Friesen, Tel: 564-8841 Fax: 562-8691.

KSAN HOUSE SOCIETY

3224 KALUM STREET TERRACE, B.C., V8G 2N1

OSBORNE HOME FULL-TIME MENTAL HEALTH WORKER

TERMS:- Temporary shift work -$13.10/nour per the BCGEU contract -full benefit package, and 6% holiday pay.

QUALIFICATIONS: Minimum grade 12. Applicants will have completed the mental health worker course and preferably have wark experience in the psychiatric field. First aid certificate and class 4 drivers license also required.

APPLICANTS SHOULD POSSESS: - Adynamic personality and the ability to motivate individuals. - Good communication and listening skills - Have the ability to introduce own ideas and demonstrate initiative. - Posses good writing skills and be able to keep accurate records and prepare reports. - Be willing to work with male and female clients. . + Knowledge of recreation activities, arts and cratts will be an asset.

record search and sign an cath of confidentiality, Resumes will be accepted until December 14, 1994 4:30 p.m. and should be addressed to: Coordinator - Osborne Home c/o Ksan House Society 202-4630 Lazelle Avenue TERRACE, BC V8G 186

Information on the program available at the address listed above.

ACCESS/DEVELOPMENT SUPERVISOR

West Fraser Mills Ltd. has an opening for the position of

§ Access/Development Supervisor at their Skeena Sawmills f Division in Terrace, B.C.

Reporting to the Woods Manager, the Access/Development Supervisor is responsible for a multi-million dollar annual road and bridge construction program within several forest tenures. You will oversee ail aspects of development in preparation for timber harvesting ranging trom budgeting to implementation,

Preterence will be given to those applicants registered as Professional Foresters, Engineers or Geoscientists. Experience

fin coastal road construction and, in particular, drilling and blasting . operations is a definite asset.

West Fraser Mills Ltd. is a major integrated company with logging and manufacturing operations in B.C. and Alberta, as well as retail outlets across Western Canada.

A competitive salary and benefits package is offered. Qualified applicants should submit a covering letter and resume ta:

West Fraser Mills Ltd.

Skeena Sawmills Divisian

s P.O. Box 10

Terrace, B.C. V8G 4A3

7 Fax: (604) 635-4335

Attention: Woods Manager

- The successful applicant must be willing to submit to a criminal

21. HELP WANTED

FOR PROFESSIONAL RESUME call Cu, Secretarial. 638-8006

SEEKING LIGHT HOUSEKEEPING and childcare in my home for 2 children 18 mths & 4 yrs, References required. 638-

The Forest Worker Development Program will be sponsoring courses in January - March 1995 for Forestry Workers and Forestry Contractors.

Cc ey

0355 The Forest Worker Development Program is designed to promote economic

SERIOUS ABOUT MEETING someone? The hottest singles for romance or friendship 1-900-451-4010 ext, 3630 LOOKING FOR TEN good people with positive attitudes. Flexible hours. Managers, drivers, and office positions. No experience necessary. Call635-2165. EXPERIENCED REPORTER REQUIRED for the Prince Rupert Daily News. Mac and Quark experience an asset. Fax resume to Publisher, 604-624-2651.

IT'S ALWAYS HANDY to have extra money around Christmas, so why not join the Avon team? $20 starts you in your own business! Avon offers tertilic products to make selling easy, ie. videos, vitamins, skin care, crafts, fashions and much more! Call today 635-9138

TEACHER WANTED FOR parent participation preschool, Reply by Nov. 26, 1994 to: P.O. Box 791, Houston, 6.C., VOU 1Z0,

Sshsoeesoceseet cess eee Contract Administration Looking for +1 Child Care? = §§

Skeena Child Care Support

Program can he!p you make rf

iY the right choice for your chitd, ff.

}) For information on choosing f

care and available options, call

4

a

Coco at 638-1113, b

A free sarvice provided by the Térraca 4 4

a

a

]

4, Silviculture Contracts 5, Site viewing

#, Contract Organization 8. Projact Controls 9. Contract Management

Building Better Training Skills

Stand Tending Tender Training

WCB Level 1 First Aid ‘44 Women's Resaurce Centra and funded with Travel Endorsement

by the Ministry of Women’s Equality, PEP SESS FSOSOSSESESESOSS

SECRETARY

required for a well established distribution company. Duties will consist of Bank deposits, payables, reconciling accounts & general office work. Some inside sales & previous office experience is required, Send or drop off resume attn:

lan Moskaluk

3011 Blakeburn St. Terrace, B,C. VBG 34

Silviculture Contracting In B.C. (10 Stand atone Modutas) 1, Overview of Silviculture Contracting

2, Getting Started in Silviculture Contracting 3, Silviculture Contracting Markets in B.C, 1 day

8. Project Plans and Bid Calculations

10, Survival Skills in Silviculture Contracting 1 day

Personal Financial Management Personal Opportunities/Career Exploration 1 day

Interest in these courses should be forwarded to the B.C. Forestry Continuing Studies Network by phone (604-847-8833)

"or fax (604-847-3537) by Dec. 16, 1994.

recovery in all regions of the province through investment and job creation. Enhanced training in forest improvement techniques in an integral part of the

Program.

The B.C, Forestry Continuing Studies Network is assessing the demand for

the courses listed below:

3 days

Basic Map and Compass Use

1/2 day

1/2 day Working as a Team 1 day - Conflict Resolution

1 day - Motivational Techniques

. 1 day - Team work Skills

1 day

1 day Pesticide Applicators Certificate 3 days

1 day

1 day Forest Health for Stand Tenders 1 day Planting { day

1 day Chainsaw repair and Maintenance § days

1 day WCE Fallers and Buckers 3 days

§ days Wildlife Danger Tree Assessor's Course 3 days

i day An Introduction to Wildlife Trees 1 day

Advanced Forestry 1 day

2 days BC Coastal Fish Forestry Guidelines 1 day

Please name the Course(s) and the preferred location. Courses will be scheduled according to demand.

‘The Forest Worker Development Program is funded by a cooperative arrangement with the Ministry of Forests, the Ministry of Skills, Training, and Labour, the Ministry of Social Services, and BC 21.

BUFFALO HEAD

FOREST PRODUCTS

BOX 70, STEWART, B.C. VOT 1Wo (604) 636-2271 FAX (604) 636-2819

Buffalo Head Forest Products Ltd.,’a"medium sized forest company based in northérn'B:G': ‘Aivités applications for the

following position within our forestry group:

PHSP FORESTER

The following qualifications are required: - be an A.P.F. or be eligible for professional registration. - applicants with technical school diploma will be considered if they meet the required experience criteria, - have two to five years forestry experience. - a working knowledge of spreadsheet and word processing computer applications, - be self-motivated and quality conscious, - have good interpersonal skills and a willingness to work in a team environment. Responsibilities will include the preparation of P.H.S.P’s, filed audits and operational planning. This is an excellent opportunity for a career-oriented person | to be involved ina variety of forestry activities. This position will be based in Stewart, British Columbia. Salary commensurate with qualifications. Buffalo Head Forest Products Ltd. offers a competitive benefit package. Please send your application by December 15, 1994 to:

Operations Forester

Buffalo Head Forest Praducts Ltd.

Box 70

Stewart, B.C.

VOT 1wo

Fax: 636-2819

BUFFALO HEAD

FOREST PRODUCTS

BOX 79, STEWART, B.C. VOT 1WO (604) 638-2271 FAX (604) 636-2819

‘FOREST TECHNICIAN

Buffalo Head Forest Products Ltd. has an opening in its Forestry Dept. for a Forest Technician. The succesful applicant will report to the Operations Forester to assist in silviculture, planning and timber activities.

Buffalo Head Forest Products Ltd. is a medium size forest company with an AAC of 342,000 M3. The company is based out of Stewart B.C. with the operating area located approximately 60 km. north of Meziadin Junction along Hwy. 37,

The company is seeking a graduate Forest Technician with a minimum of 2 years experience. The applicant should have a strong silviculture background with experience in planting supervision/administration and silviculture surveys. A working knowledge of tree and plant identification and Stream classification systems would be an asset. A working knowledge of computer software such as WP and Excel would be desirable.

Buffalo Head Forest Products Ltd. offers a competitive wage and benefit package as wellasa subsidy for housing,

Please forward resume by December 10, 1994 te: Operations Forester : Buttalo Head Forest Products Ltd.

Box 70 Stewart, B.C. VOT 1Wo (604) 636-2271. Fax: 636-2819