THE CORPORATION OF THE CITY OF PORT COQUITLAM BYLAW_NO, 2568

SCHEDULE C

PERMIT FEES AND INSPECTION CHARGES

BUILDING PERMIT FEES

Every applicant for a building permit shall pay fees calculated as follows, prior to the issuance of the permit:

Value of nstruction Permit Fee Payable

(min. fee $30.00)

$ 1 5,000. coe ee 2 per $1,000 $ 5,001 20,000. .$ 10.60 plus per $1,000 $ 20,001 50,000. .$ 53.00 plus per $1,000 $6 50.001 5¢c0,000. .$127.00 plus per $1,000 $500,001 and over .$657.00 plus per $1,000

In addition the following fees shall also be payable to assist in defraying the cost of microfilming of plans:

2.1. for residential alterations under $5,000.00 a fee of $4.50;

2.2. for single family residential construction a fee of $10.50;

2.3. for all other types of construction a fee of $15.90.

In addition a permit fee of $20.00 shall be payable for each chimney

to be constructed, altered or repaired, including a single flue chimney or a fireplace with a masonry flued chimney.

PLAN PROCESSING FEE

A plan processing fee shall be payable before processing of building permit application as follows:

For a permit application to construct a new single family dwelling, a fee of $100.00.

For a permit application for a building or structure other than a new single family dwelling a fee equal to fifty percent (50%) of the permit fee under Section 1, to a minimum of $30.00 and a maximum of $2,500.00.

The plan processing fee will be credited to the Building Permit Fee at Building Permit issuance.

ITEM