“THE CORPORATION OF THE CITY OF PORT COQUITLAM

GIL

DEC - 8 1975

December 5, 1975,

TO: MAYOR AND COUNCIL FROM: LEISURE ACTIVITIES COMMITTEE

RE: INDOOR POOL RATES

Several requests have been received to nent the Hyde Creek pool and as yet no rental nates have been set. Ads the pook has been in operation for such a short period, it is difficult to estimate the hourly operation cost at this time. PLease see attached sampling of nates in swvounding areas. It is rxecommended that we adopt the

Coquitlam nate of rentals and further, that the rates be rzeviewed in

Juky, 1976 fora possible upgrading.