~ we

: Um hy Mt i 14]

a ”

THE CORPORATION OF THE vaem CITY OF PORT COQUITLAM JUL 27 1992

MEMORANDUM

TO: BUR. Birk DATE: July 20, 1992 City Administrator

FROM: LR. Zahynacz, P. Eng. City Engineer

SUBJECT: Parking Restrictions - Wilson Avenue from Mary Bill Road to Kingsway Avemuc (Public Works Couumitiee Meeting of Jaly 14, 1992)

That Council approve the installation of "Two Hour Parking Limit" signs on both sides of Wilson Avenue from Mary Hill Road to Kingsway Avenue.

As described in the attached memorandum from the Project/Traffic Technician dated July 9, 1992, at present there are no parking restrictions for the majority of Wilson Avenue between Mary Hill Road and Kingsway Avenue as shown in Figure 1. As there is a need for short duration parking due to the new medical centre, it is recommended that this area be posted with

two hour maximum parking limits as shown in Figure 2.

af LL hate

ae LY. A. JY) OLR. Zahynacz, Eng. F It / City Engineer ea IRZ:ck /

Attachments

L