DR the tel

Required Work:

Item 1) - to eliminate traffic from travelling thru the City owned lot approx. 6 'no post' barricades are required along © the north and east property line.

Cost: 'no post' barriers at $100 each placement by City crew $200 Total $800

Item 2) - to remove the existing grass boulevard and replace with a concrete sidewalk and barrier curb and gutter.

Cost: approx. 20m curb and gutter | | complete with sidewalk at $110/m remove existing boulevard and curb. complete approx. $750 Total $3000.

Suggest waiting with this item as the proposed courthouse complex may alter curb offsets and intersection

configuration etc.

attach

ae)

Ile De Boer 7 So Project/Traffic Technician