SCHEDULE "A"

“Hamilton Street (3600 Block) Pavemeut, Extruded Concrete Curb and Storm Sewer

Local Improvement Assessment By-law, 1979, No.1690"

COLUMN I COLUMN II

Description Foot Frontage Charges Duration Tax Roll Annual First Year Years Last Year

sot Block Plan Number Actual Taxable Rate Charge of Charge of Charge of Charge

921339 67.13 67.13 153.73 1980 1989 921338 67.15 67.15 153.77 1980 1989 921337 67.15 67.15 153.77 1980 1989 921336 67.15 67.15 153.77 1980 1989 921335 67.15 67.15 153.77 1980 1989 921334 67.15 67.15 153.77 1980 . 1989 921333 67.15 67.15 153.77 1980 1989 921332 67.15 67.15 153.77 1980 1989 921331 ' 67.15 67.15 153.77 1980 1989 921340 67.14 67.14 153.75 1980 . 1989 921341 67.15 67.15 153.77 1980 1989 921342 67.15 67.15 153.77 1980 1989 921343 67.15 67.15 153.77 1980 1989 921344 67.15 67.15 153.77 1980 1989 921345 67.15 67.15 153.77 1980 1989 921346 67.15 67.15 153.77 1980 1989 921347 67.15 67.15 153.77 1980 1989

921348 67.15 67.15 153.77 1980 1989

1208.67 1208.67 $2767.80

renee