2.5 Maximum Sign Area

The sign area of a sign shall not exceed 14.2 m2 (150.7 sq. ft.) per face of the sign, except as specifically permitted in this bylaw.

2.6 Maximum Copy Area The copy area of a sign shall not exceed 75% of the sign area.

2.7 Sign Appearance The materials used in a Sign structure and the form of a Sign structure shall be compatible with the materials used in the principle building on

the parcel and the architectural form of that building,

2.8 Maximum Projections

(1) The maximum projection of a sign from the exterior wall of a building to which the sign is attached shall not exceed 3.0 m. (9.94 £t.),

No sign shall project to within 0.6 m. (1.96 ft.) horizontally of the curb line of any highway.

2.9 Signs on Public Property No commezcial signs, whether made out of paper, cardboard, cloth, canvas, plastic or similar materiais, shall be tacked, posted or otherwise affixed to the walls of any Structure, tree, pole, hydrant, bridge, fence or any other surface within a public place.

2.10 Hazardous Signs

(1) No signs shall create a potential hazard to the safe, efficient movement of vehicular or pedestrian traffic.

No sign shall be placed in a manner that may obstruct any window opening, door opening, passageway, fire escape, walkway, -ehicular driveway or similar feature.

2.11 Traffic Control Signs

No signs shall have the shape and colour of a traffic control device referred to in the Motor Vehicle Act.

2.12 Approval of Signs over Highway or Public Place

(1) No commercial Sign shall be located upon or over a highway or public place unless the owner of the Sign has entered into an authorizing agreement with the City

Sry aN

Be SSE?

2.

ay.