et ae de ne Ga ye

pedestrian actuated components are functioning. The Committee considered tnis to be an urgent safety problem that must o6 resolved quick estimate for a replacement controller unit is some The Committee recommends that the existing controller unit be replaced and that the necessary funds be approved by Council in the form of increasing the 1988 budget for the maintenance of traffic signals by 37,000. Hence, the second recommendation before Council.

ae KK.

T.M. Chong, Ps tng.

City Engineer

MAIN. T~FEB/388( 37