July 8, 1991/166

A Public Hearing pursuant to Section 956 of the Municipal Act was held prior toe the Council meeting of the Corporation of The City of Port Coquitlam held ‘in the Council Chambers, Port Coquitlam City Hall, 2580 Shaughnessy Street, Port Coquitlam, B.C. on Monday, July 8th, 1991 at 7:30 p.m.

His Worship Mayor L.M. Traboulay and Aldermen M.J. Gordon, M.A. Thompson, J.J. Keryluk, R.N Talbot and M.R. Wright in attendance.

Alsc in -attendance were City Treasurer/Acting Deputy Administrator J. Maitland, Acting City Clerk S. Rauh, Deputy City Engineer K. Gaudry, Director of Planning C.R. Felip, Director of Parks and Recreation K.J. Taylor, Fire Chief J. Baillie, Deputy Fire Chief G. Routley, and Junior Planner J. Lee.

ZONING PUBLIC HEARING:

His ‘Worship Mayor L.M. Traboulay advised the following proposed Bylaw would now be considered: .

Bylaw 2607: To rezone:

Lot 38 District Lot 479 Group One . Plan 2145 | ‘New Westminster District

from RS-1 (Large Lot Residential) to P-4 (Utility District). The property. is located at 3253 Sefton Street and would permit the . construction of an automated telephone switching building on the property. =.

| Mr. Douglas Green of B.C. Tel was present to provide information regarding —

‘the proposed building. | a es COE

The meeting adjourned at 7340 p.m.

“Certified fair and accurate,

‘ on

'n

Keting City Clerk |