FPR SE DSLE an Med an 4 WE eG htt : fe sitet f AERA ae vee

Ne ia

vy Ad, (ents awe { . ‘ i i oh A ah ec Anand +. ; - Ms Kit * r ae 43 ts , ; ni ve thee ay ita eeu iel : ‘ iy} Pv yen 44 mK } ; SR RUR tie ; tee CSP A RA an Waele ye . , A; ds ‘ ; Ps etintale pesullooa eerie Renee pt Ue Ne ae Te

aun ) bai hited

SCHEDULE F | ANTENNA INSTALLATION SPECIFICATIONS

Type — Sinclair SRL310C-2 (except White Rock ). oe | Sinclair SRL310C-4 (White Rock FOC) (or equivalents to above) oy

Mounting —s Installation to make provision for vertical adjustment i of + 2 feet to optimize signal level to and from repeater site. . | | os

Mat

Sox

One of the following methods:

ae

1. Side mounted on existing tower. Antenna will be mounted to tower with appropriate pipe to parallel pipe Clamps. with the antenna being situated as high as

~ possible on the tower. Maximum spacing from existing antennae is to be provided. |

2. Pipe mounted. An appropriate length of 2 1/2 inch 1.0. schedule 80 aluminum pipe will be mounted to the

side of the building with pipe to wall clamps so that

the pipe clears the building. The base of the antenna will be mounted to the pipe with two pipe to parallel pipe clamps spaced at least 24 inches.

“Orientation Station — - _ Dipole azimuth : i | mo — (from True North)

~ Burnaby - | | . 3000 Port Moody | 280° Port Coquitlam coe 2959 Coquitlam . 2909 Coquitlam Fire | 300°

~ New Westminster | 3209 Surrey. 3059 Delta _ | 159 Richmond — - | — 60° “Vancouver = ~ 9QO North Vancouver — 110° White Rock 9. | : 3259

eerie

ors

imi

Ap

Shmeanye

Fine tuning adjustments to the above will be made during testing of the system in operation,

Vo Pres yonrtesi is Wade OH scorn talhidhug gt

Raat

Rae 4 ih

iy Ronse sip Hy , |