10 : B.C. LUMBER WORKER : East! 2

More Convention Scenes

AND EARLY OFFICIAL RECORDS OF ORIGINAL BOOT DESIGNS PATENTED IN OTTAWA BY PIERRE PARIS IN 1922-1924

PROVE Finis gera te Granparo lf

aT

0 all to ohn Aesy preseuts slyill come

PATENT No, 241706

1924 “COUNTER ASSEMBLY”

4 : “INSTEP Pierre Paris & Sons gees 51 West Hastings Street Vancouver, B.C. 1922

A Family Business Owned and Operated In B.C. Since 1907