City of Port Coquitlam

Capital Improvement Program

Project Operating Department

Ballpark Lighting Program Parks & Recreation Description

Justification

To install lights and ballparks Parks & Recreation Master Plan

Location As Shown

Amount

Cedar Drive $230,000 = $230,000 Thompson 345 ,000 % $345 ,000

=| $230,000 [$345,000

Estimated NET. effect on operating costs $12,500

$12,500

Repayment costs interest. Term 15 years.| @ $55,397

$55,397

Comments

Project Number