; Page. 2 CITY OF PGR COA est AMoe RECAP OF STVES RATES . Present : Calculated Recommended ae : te Monthly . Rate. on basis Monthly User Jiate : of Water Can- Rate vey Ot sumption in Remarks LGU “197. SFT ee ; . a o? not ta oe . $ 20.00 $2.00 G0 $ $6e—— down 2.00 1.00 (2.00... unchanged 20.00 oe 20.00 CES ach angéd 4.00 7 , P56 SOR down . 4.00 co me down _ 20.00.50 3.00 . 180 woo " sfb oper unit. : . . _ | Se APD Pee ot a ; Perna G7.02° 7.25 00 a $.00 +)10.00 2. ouP 37 x ; ; _ $1. per )* a ; o od : room. } cet \ Medteal Centres’- 5 units 6.50. = —sti«C2S 1 @ 25.00. $20100+) 24.00 = 8+. sp 53.8%. oe each after =~ 65 ; 25.35: 1@ 37.00 $l.each ) oa ee se ms $10.00+) 39.00.) |.” up 53:8%.,

-$l.each )

65

each: after

(3b untes) Esco ce 25.38. 226.00... ° BOR 20 units) « Macro’ ames oe 16.25 © 124.00 ° £00 IT 00 7 83.200. 168.00 ~e0-00 fbo:B0_ ;

~ co . , Firat Zn Winn Rare.

Barbers, hairdressers, photog praphers, : nachine shops, business. offices, banks, , oe : ' professional offices,’ druggists, ware~ “houses, repair shop, hails, florists, aute wreckers, auctioneers : od

* ee. all ‘users not herein provided for, vthe mininun ‘monthly. User Rate shall

5.00

ee Cosa te, '.% Rate Structure: Plants with rate of water usage for the : ae . previous year of Jess than one million po a ees ae : gals. per year are to be charged $10. for : : ee a : ee pe the first 5 fixtures and $1.00 cach there- : a es fo ; , ; after, Plants with rate of water usage of : an :

one nillion pals. or mere per year to be .

charged hand for cach complete million en gallons ,? Hr