ON Ee VEN

GS Re PAC AL Aatyl SANE Wits aarp bee Fi

A plan processing fee shall be payable before processing of a building, building moving, plumbing or sign permit application as follows:

4.1. For a permit application to construct a new single family dwelling, a fee of $100.00.

4.2. For a permit application for a building or structure other than a new single family dwelling a fee equal to fifty percent of the permit fee under Section 1, to a minimum of $50.00 and a

maximum of $2,500.00.

For a plumbing permit, type: fireline/sprinkler or on-site services, a fee of $50.00.

For a sign permit, a fee of $50.00. For a building moving permit, a fee of $50.00.

The plan processing fee will be credited to the building, building moving, plumbing or sign permit fee at permit issuance.

An applicant for a Building, Building Moving, Demolition, Plumbing or Sign permit may obtain a refund of the Permit Fee when a permit is - surrendered and cancelled before any construction begins, on the following basis: © oe oo oe mo

The City Treasurer shali refund ninety percent of the balance of the permit fee in excess of the plan processing fee. ;

A plan processing fee is not refundable.

: . : ,

No refund shall be made where construction or work has begun or an inspection has been made. eae a

ah No refund shall be made for an amount of $50.00 or leas.