Y Paynes . i ALAA ri hi TORN raeeeD As An

Tan : Yi

4 was sehr 5 : 4 ; Feld DL AGe + prophase ¥ ;

ee V ai .t ‘ wh Te, i we Any a IRA Sf : ‘ te ER ra Y ees vw ; 4

PRRs DSC Ae Sane a Lape ed al ce de eg) ie MASfa Pith taser ob ghee

Ue Dee Roce en TOP RES

Lapa’

Rae Aa is : ;

TA t y Yrie. iM ws ety HE ea *, ae Rte, by brea’ re Ba ENS M4, MD eG yt Lily : “ sai : : Ay hclna te Ps pohed Yap BNNs re ; WDE beg (2 Pere rig der tee kn vie ad sais We pn : diana ey My NC ri Mey tie : age LMT ones Repay fe LA PEATERERC KA ACA er ikea :

we

3.0 Alternatives: A number of altematives are available for consideration:

3.1.1 Extend culvert draining lower field at Thompson Park and fill in short water course to the cast of Thompson Park.

3.1.2 Fill in water course along the length of Thompson Park,

3.1.3 Relocate fence along west side of Work Yard to the west edge of the water course.

3.1.4 A combination of the above.

lest

Financial Implication:

The cost of extending the culvert to the water course on the east edge of Thompson Park is estimated to be $3650.00 As identified in the attached memo from Steve Brown, this price includes the connection and installation of pipe complete with a concrete bag heudwall and includes the capping of the existing inlet structure on Cameron Avenue. It does not include fill, top soil or seeding.

It is felt that the fill and top soil can be obtained at no charge from other City projects.

A change order would be required to relocate the fence along the Works Yard property to the west side of the water couse. The cost of this change order has been estimated at $3,076.61. Please see the attached memo from Gord Voncina. Citizen Implication:

People who use Thompson Park will be most appreciative of any improvements that can be made to the existing situation at Thornpson Park.