Rogers Cable T.V. Limited

R6G ERS .f L { s Ae ee 5 ae TLAM WA ON DW eon Coauitlam, 3c VIC 155 Ny T cece tla WY NGV 2 6 agp - ovember 20, 1992 =| oo 2ar">- MG nat me | rei (604) 94-0461 PO De kes oe: eo Fax (604) 941-2477 Mr. Igor Zakynacz, P.Eng._: .; _.------------- ——| : City Engineer J rt | City of Port Coquitlam “'_7 | 2580 Shaughnessy Street. - is Port Coquitlam, B.C. ~~ ot V3C 248 7 Dear Sir sl

—_—

_

It has been brought to my attention that in conversation with one of our employees, you suggested we could have changes made to the parking on Kingsway Avenue in front of

our business.

In 1985 we formailly/requested that parking be eliminated between the driveways of 1820 and 1830 Kingsway. Although our request was denied, the City did see fit to reduce the speed limit in the area to 50 KPH.

In light of two recent accidents and considering the many accidents that have occurred since our last request, we again wish to have you reconsider our request to eliminate all

parking in front of our business.

We feel this would require posting a sign and the painting of the curb.

| am sure you could confirm both the number and cost of the claims for the numerous accidents that occur, in order to convince yourselves that reducing the speed was not the total answer and in fact increasing the visibility is a must.

| have enclosed the previous correspondence for your confirmation.

Thank you in advance for your anticipated, expeditious co-operation.

Yours wf Ean bp oO | - _ a Robert C. Leslie LoS Division Manager o ae

Encl.