. .

" THE CORPORATION OF THE CITY OF PORT COQUITLAM . C 0 U

MEMO OCT 20 {980 Mayor and Aldermen. DATE: October 9, 1980

J. Bolleau, Deputy Fire Chief.

5 i 1 1

RE: PORT COQUITLAM FIRE DEPARTMENT REPORT ~ September 1980

Alarma ringing Bush fire Garbage container Gas spill

1 House fire

1 2 1

Motorcycle False alarms Back yard burning

1 Barn fare

2

62 45

Commercial

Inhalater calls

Patients transported

Firemen attended

Man hours

Firemen off sick ~ total 4 days Volunteers paged 2 times

Total damages ~ NIL

62 Inhalator calls, 29 home emergencies consisting of heare attacks, breathing problems, silesures, and various aecidents. Eleven M.V.A.'s, 41 street incidents mostly falla and fights. Your industrial accidents, 2 overdoses, 2 school accidents, 2 sport accidents, and two deaths invelved with fire arma,

Summary for 1980 and same period tn 1979

1980 1979 Fires and related incidents 216 damages $691,388* 268 damages $268,700 Inhalator calle 463 462 . Patients transported 372 365

* Thia doas not include Golf Club Fire ., Ginsurance $1,375,000)

J. Boileau, Daputy Chief,