see sd yas

cd

d

peeved ws ek inn aiedatynd aud BAS i

he

sie

THE CORPORATION OF THE CITY OF PORT COQUXTTLAM

MEMORANDUM MAR 1 1 1991

TO B.R. Kirk March 7, 1991 City Administrator .

FROM: J.L. Baillie Fire Chief

SUBJECT: Purchase of emergency vehicle

RECOMMENDATION:

1) That the puechage of a fhavrolet Police Special, 4-door Sedan from Flag Chev-Olds be authorized at a4 cost of $19,016.43.

That emergency lighting ard radio be inatalled by Anderson Engineering at a cost of $2,100 be authorized.

3) That the monies be taken from the Fire Department Equipment Reserve Fund.

BACKGROUNDS _& COMMENTS:

VEHICLE HISTORY - The Mechanic Foreman Mr. Joe Huber recommended that the vehicle

be replaced in 1985. In 1987 the car received $2,700.00 worth of damage in a motor vehicle accident. Theicsr leake, it is unreliable, and it is not cost “4 effective.

,

QUOTATION REVIEW - The Mechanic Foreman states that the vehicle meets all specifications, and agrees with Mr. fT. Day's recommendation to take the low bid from Flag Chev-Olds Ltd. The Protective Services Committee has reviewed the background material and concurs with the recommendation.

There are sufficient funds in the , Fire Dept. Equipment Reserve Fund.

Jon Baillie im Maitland Fire Chief City Treasurer Port Coquitlam Fire Dept.