Most of the existing catch basins are set back from the paved surfac incorporated with landscaping. The existing mains in this area should be reviewed for upgrading in the near future, as this system is undersized for the catchment area.

COSTS:

Option! Remove and relocate existing catch basin to the front of 1848 Windermere complete with road patch. Lump sum - $1,900.00 + or -

Option 2 Install new catch basin and tie to existing main in front of 1848 Windermere complete with road patch. Lump.sum - $2,000.00 + or - |

Option 3 50m. + or - of asphalt curb complete with asphalt flume to existing

catch basin. 50m. + or- @ $50.00/im. = $2,500.00

4D bo

ike DeBoer Project Technician

-YDB:sw

Attachment _