-~2Q-.

One copy of each permit is held by the Engineering office and one copy is given to the applicant. The Fire Department must be advised by phone giving the details of the permit. oe

The Subdivision Inspestor should be advised, and the Works Superintendant should be notified in time to schedule the work. A Photocopy of the permit should be sent to each of the above.

cee ne ee er eee ae ee mee oe memes etme we