Dette tee Tabs ATs

aT FTES

l 2 [feet | £195 | 2179 | 267 | 2138 | 2193) 21294 4

GRANT

AE | 262 21S) LOT) thee 19 | 201 20522] “#6

210

SHAUGHNE

93 23

e v7

2

PL. 21042 2d93S-Ot

Mz CAMBRIDGE

PL tS

SERN

SUE

Py

aan “4

ED} A. 32.497

Pek 8B

— . Y Ly * PLAN S9ZI6 eae zosp sd BSP sass cose CCOUviTLA v)

STREET sasmaere, ty

7

63688 2955

CAMBRIDGE

2225 Cevuitlam Avenue

Development Variance Permit (File No.