COMMIS FROM OTHER DEPARTMENTS : The Following departments commented as roted: Building Department, Fire Department, Parks and Recreation Department: No comments. Engineering Department:

Sanitary

Location of connections to GVSDD main require prior approval.

Right of Way required if sanitary installation goes beyond application boundary.

Sizing to be determined by developer.

storm ; As outlined in G.D. Hamilton Riverwood Control Plan Report

trunk main to be constructed to Dominion Avenue and Ottawa Right of Way for this trunk main will be required prior to subdivision.

Dominion Pump Station to be upgraded as required.

Water Main sizing to be determined, looping of system may not be necessary at this stage of development. Consultant to confirm adequate water

pressure at end of system.

Tie-in for watermain at this time will be at Robertson and Coast Meridian.

Roads

Location and type of roads to be constructed in accordance with G.D.: Hamilton report.

Provision to be made for bicycle path or corridors.

Signal lights to be installed at Coast Meridian and Robertson intersection.

All works to be constructed in accordance to the present Subdivision Servicing Bylaw and to follow the control plan as established for the area.

Development cost charges for she Riverwood Subdivision have yet to be finalized. Until such time as the Provincial Government approves the rates for this area, a trust fund could be set.up to hold funds that

will be collected.

Developer and latecomer agreements to be in place prior to final subdivision approval.

ITEM